0.1 0.2 0.3 0.4 0.5 0.6

0 0.2 0.4 0.6 0.8 1 1.2 1.4 h ϕ /ϕ^{fin init}

R-H prediction varyε vary q

Fig. 2, A.M. Dimits, Physics of Plasmas