Fig. 7, A.M. Dimits, Physics of Plasmas

0 50 100 150 200 250

Normalized heating power (P/P^0) 0.0 0.2 0.4 0.6 0.8 1.0

(IFS-PPPL∇ T) / (GK∇ T)