Fig. 8, A.M. Dimits, Physics of Plasmas

0 2 4 6 8

Pedestal temperature (keV) 0

5

10

15

Q (Paux = 100 MW)

IFS-PPPL

GK fit GK fit/2

GK fit/2, low n^e